MOD: PV Ertel’s PV calculated from wind, temperature and density

MOD: PV AIM Modified Ertel’s PV as defined in the preparatory steps

- ANO: PV Ertel’s PV anomaly as the difference of calculated and modified PV

ANO: QGPV Aproximate quasi-geostrophic PV anomaly calculated from Ertel’s PV anomaly