Start

Copy [post1] Copy MOD from run directory and P file from input directory

Rotate [post2] Rotate MOD file from quasi-cartesian coordinate to geographical latitude/longitude system

Vertical Level [post3] Transform from equi-distant vertical levels to ECMWF hybrid vertical levels

Secondary fields [post4] Calculate Ertel’s PV and potential temperature from P file

Make clean [post5] Remove files which are no longer needed (MOD and GEO in output directory) End

MOD → GEO

GEO → P

P → S