-60 -50 -40 -30 -20 -10 0

200

300

400

500

600

700

800

900 Temperature [ ^°C ]

Pressure [ hPa ]

850 hPa ~ 1210 m

700 hPa ~ 2718 m

500 hPa ~ 5247 m

400 hPa ~ 6831 m

300 hPa ~ 8832 m

250 hPa ~ 10090 m

200 hPa ~ 11624 m

150 hPa ~ 13561 m